From d5d97870c3b0c09693697be8c37b205fbea99acd Mon Sep 17 00:00:00 2001
From: "Robert C. Helling" <helling@atdotde.de>
Date: Tue, 8 Aug 2017 15:59:38 +0200
Subject: Move the decision how to typeset unit to TeX-style file

This way, the user can adopt those once and for all for all
her dives. This includes the space between number and unit symbol.

Signed-off-by: Robert C. Helling <helling@atdotde.de>
---
 subsurfacetemplate.tex | 14 ++++++++++++++
 1 file changed, 14 insertions(+)

(limited to 'subsurfacetemplate.tex')

diff --git a/subsurfacetemplate.tex b/subsurfacetemplate.tex
index 9662d9068..2441aa32e 100644
--- a/subsurfacetemplate.tex
+++ b/subsurfacetemplate.tex
@@ -9,6 +9,20 @@
 \parindent=1cm
 %\offinterlineskip
 \long\def\page{
+%% Unit symbols, add spaces in front if you prefer
+\def\unitmeter{m}
+\def\unitft{ft}
+\def\unitkg{kg}
+\def\unitlb{lb}
+\def\unitbar{bar}
+\def\unitpsi{psi}
+\def\unitcentigrate{${}^\circ$C}
+\def\unitfahrenheit{${}^\circ$F}
+\def\unitliter{$\ell$}
+\def\unitcuft{cuft}
+\def\unitmeterpermin{m/min}
+\def\unitftpermin{ft/min}
+%
 $$\vbox{\hrule     % upper cutting line
 \vskip 2.0cm       % upper whitespace
 \vrule             % left cutting line
-- 
cgit v1.2.3-70-g09d2

